145�45’E

145�45’E

145�40’E

145�40’E

145�35’E

145�35’E

145�30’E

145�30’E

15�5’N

15�5’N

15�N

15�N

14�55’N

14�55’N

14�50’N

14�50’N

Tinian Island with Aguijan Island & Tatsumi Bank BPI Structures

5-m grid cell size NOAA PIFSC Coral Reef Ecosystem Divison Pacific Islands Benthic Habitat Mapping Center NOT FOR NAVIGATION

UTM, Zone 55N, WGS84 0 3 6 9 Km

„

Bathymetric Position Index (BPI) Structures are derived from two scales of a focal mean analysis on bathymetry & slope. The scalefactors 50 & 250 were used to predict reef structures (see discussion in metadata). Three ranges of slope defined flats, slopes, and near vertical: x < 5; 5 < x < 70; x > 70. Depth bounds separated flat structures into shelf (0 to -100m) & deep shelf (-100 to -1000m) environments. The depths were based on a bathymetric drop off outside the harbor & at the edge of Tatsumi Bank.

Aguijan

Tinian

Tatsumi Bank

BPI Structures

Narrow Depression Depression on Flat Midslope Depression Depression on Crest Open Depression Shelf Escarpment Crest in Depression Crest on Flat Midslope Crest Narrow Crest Near Vertical Wall Broad Crest Deep Shelf