145�48’E

145�48’E

145�45’E

145�45’E

145�42’E

145�42’E

18�12’N

18�12’N

18�9’N

18�9’N

18�6’N

18�6’N

18�3’N

18�3’N

18�N

18�N

Pagan Island BPI Structures

10-m grid cell size NOAA PIFSC Coral Reef Ecosystem Divison Pacific Islands Benthic Habitat Mapping Center NOT FOR NAVIGATION

UTM, Zone 55N, WGS84

0 2 4 6 Km

Bathymetric Position Index (BPI) Structures are derived from two scales of a focal mean analysis on bathymetry & slope. The scalefactors 50 & 250 were used to predict reef structures (see metadata for discussion). Two ranges of depth defined the shelf (0 to -60m) and deep shelf (-60 to -1000m), based on the shelf on the Southwest side of the island with a distinct drop off at -60m.

Pagan

BPI Structures

Crest in Depression Crest on Flat Midslope Crest Narrow Crest Near Vertical Wall Broad Crest Deep Shelf

Narrow Depression Depression on Flat Midslope Depression Depression on Crest Open Depression Shelf Escarpment