4.3167 4.3168 4.3168 4.3169 4.317 4.317 4.3171 4.3171

x 10^4

-600

-500

-400

-300

-200

-100

0

100

Time [s]

[mV]

LauLFf0b04_1-3, raw data Ch1 Ch2 Ch3 Ch4 Ch5 Ch6